en	Frontend Login

en	Frontend Login

en	User Storage Page

en	Define the Storage Folder with the Website User Records, using a comma separated list or single value

en	Recursive

en	If set, also subfolder at configured recursive levels of the User Storage Page will be used

en	Display Password Recovery Link

en	If set, the section in the template to display the link to the forgot password dialog is visible.

en	Display Remember Login Option

en	If set, the section in the template to display the option to remember the login (with a cookie) is visible.

en	Disable redirect after successful login, but display logout-form

en	If set, the logout form will be displayed immediately after successful login.

en	Email Sender Address

en	email address used as sender of the change password emails

en	Email Sender Name

en	Name used as sender of the change password emails

en	Reply-to email Address

en	Reply-to address used in the change password emails

en	Date format

en	Format for the link is valid until message (forgot password email)

en	Layout root path

en	Path to layout directory used for emails

en	Template root path

en	Path to template directory used for emails

en	Partial root path

en	Path to partial directory used for emails

en	Template name for emails.

en	HTML emails get the .html file extension, plaintext emails get the .txt file extension.

en	Redirect Mode

en	Comma separated list of redirect modes.\ Possible values: groupLogin, userLogin, login, getpost, referer, refererDomains, loginError, logout.\ Warning: redirects only work if neither the plugin nor the page it is displayed on are set to `hide at login`.

en	Use First Supported Mode from Selection

en	If set the first method from redirectMode which is possible will be used

en	After Successful Login Redirect to Page

en	Page id to redirect to after Login

en	After Failed Login Redirect to Page

en	Page id to redirect to after Login Error

en	After Logout Redirect to Page

en	Page id to redirect to after Logout

en	Disable Redirect

en	If set redirecting is disabled

en	Time in hours how long the link for forgot password is valid

en	How many hours the link for forgot password is valid

en	Allowed Referrer-Redirect-Domains

en	Comma separated list of domains which are allowed for the referrer redirect mode

en	Expose existing users

en	Expose the information on whether or not the account for which a new password was requested exists. By default, that information is not disclosed for privacy reasons.

en	Path to template root (frontend)

en	Path to template directory used for the plugin in the frontend. Extends the default template location.

en	Path to template partials (frontend)

en	Path to partial directory for the plugin in the frontend. Extends the default partial location.

en	Path to template layouts (frontend)

en	Path to layout directory used for the plugin in the frontend. Can be used to introduce a custom layout.