en	Website User Login

en	Login Form

en	Login/logout form used to password protect pages allowing only authorised website users and groups access.

en	Redirect at Login to Page (felogin)

en	Forgot hash

en	General Header

en	General Message

en	Redirect Header

en	Redirect Message

en	Welcome Header

en	Welcome Message

en	Login Success Header

en	Login Success Message

en	Login Error Header

en	Login Error Message

en	Status Display Header

en	Status Display Message

en	Logout Header

en	Logout Message

en	Forgot Password Header

en	Forgot Password Message

en	General

en	Redirects

en	Messages

en	Display Password Recovery Link

en	Display Remember Login Option

en	Disable redirect after successful login, but display logout-form

en	FE group select mode:

en	Show all

en	Show selected

en	Don't show selected

en	(from Typoscript)

en	FE group selection:

en	no group

en	Using fieldlists below:

en	User Fields/list:

en	User Fields/details:

en	Redirect Mode

en	Defined by Usergroup Record

en	Defined by User Record

en	After Login (TS or Flexform)

en	After Logout (TS or Flexform)

en	After Login Error (TS or Flexform)

en	Defined by GET/POST Parameters

en	Defined by Referrer

en	Defined by Domain Entries

en	Use First Supported Mode from Selection

en	Disable Redirect

en	After Successful Login Redirect to Page

en	After Failed Login Redirect to Page

en	After Logout Redirect to Page

en	Template File

en	User Storage Page